200 1000

.25 . 3 .35 . 4 .45 . 5 .55

RMS error, averaged over first 10 episodes

0 0.2 0.4 0.6 0.8 1 α

1

2 3 5 8 15

30 60 100

15 8 5

.35

. 4

.45

. 5

.55

0 0.1 0.2 0.3 α

ON-LINE n-STEP TD

1

2

3

4 6 8 15

30

60 100 200 1000

OFF-LINE n-STEP TD

RMS error, averaged over first 10 episodes