. 3

.35 . 4 .45 . 5 .55

0 0.1 0.2 0.3 α

λ =0 λ =.2 λ =.4

λ =.6

λ =.8 λ =.9 λ =.95 λ =.975 λ =.975 λ =.99 λ =1

OFF-LINE λ -RETURN

RMS error, averaged over first 10 episodes